From 4eb33b4c70e980d4689c42d359f9321a4b41df6c Mon Sep 17 00:00:00 2001
From: Barry Warsaw
Date: Sat, 22 Oct 2011 20:04:13 -0400
Subject: digest_size_thresholds should be floats.  This still doesn't work in
 PostgreSQL.

---
 src/mailman/database/sql/postgres.sql | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/mailman/database/sql/postgres.sql')

diff --git a/src/mailman/database/sql/postgres.sql b/src/mailman/database/sql/postgres.sql
index 45cf74eff..2ca94217f 100644
--- a/src/mailman/database/sql/postgres.sql
+++ b/src/mailman/database/sql/postgres.sql
@@ -53,7 +53,7 @@ CREATE TABLE mailinglist (
     digest_header TEXT,
     digest_is_default BOOLEAN,
     digest_send_periodic BOOLEAN,
-    digest_size_threshold INTEGER,
+    digest_size_threshold REAL,
     digest_volume_frequency INTEGER,
     digestable BOOLEAN,
     discard_these_nonmembers BYTEA,
-- 
cgit v1.2.3-70-g09d2

